MODE: FCST_ERO_Surface_FULL at Surface vs OBS_PP_ALL_Surface_FULL at Surface

Forecast Observation

1 2 1 2 3

Fcst Obs Interest 1 1 0.9262 1 2 0.9239 1 3 0.9198 2 1 0.5934 2 2 0.1932 2 3 NA

Forecast Observation Model Field Level Units Initial

Valid

Accum

WRF FCST_ERO_Surface_FULL

OBS_PP_ALL_Surface_FULL Surface Surface None None 2015 06 11 12:00:00

2015 06 11 12:00:00 2015 06 12 12:00:00

2015 06 12 12:00:00 24:00:00 24:00:00

Centroid/Boundary Convex Hull/Angle Aspect/Area Int Area/Curvature Complexity/Intensity Total Interest Thresh

1.00 1.00 8.00 1.00 0.00 1.00 1.00 0.00 0.00 0.00

0.70

Forecast Observation Mask M/G/P Conv Radius Conv Thresh Obj Filters Inten Perc Merge Thresh Merging Matching Simple/M/U Area Area M/U Cluster MMI MMI (F+O) on/of f/of f on/of f/of f 0 0 >=0.1 >=0.1 2 2 p50 >0 >0 thresh thresh

match/mer ge 2/1/1 3/3/0 7271 3882 7180/91 3882/0 1 1 0.7598 0.9239 0.9239

MODE: FCST_ERO_Surface_FULL at Surface vs OBS_PP_ALL_Surface_FULL at Surface Forecast

0.000.00

0.010.01

0.02

0.02

0.030.03

0.04

0.04

0.050.05

0.060.06

0.07

0.07

0.080.08

0.09

0.09

0.100.10

0.110.11

0.12

0.12

0.130.13

0.14

0.14

0.150.15

0.160.16

0.17

0.17

0.180.18

0.19

0.19

0.20

MODE: FCST_ERO_Surface_FULL at Surface vs OBS_PP_ALL_Surface_FULL at Surface Observation

0.000.00

0.000.01

0.01

0.01

0.010.02

0.02

0.02

0.020.03

0.030.03

0.03

0.04

0.040.04

0.04

0.05

0.050.05

0.050.06

0.06

0.06

0.060.07

0.07

0.07

0.070.08

0.080.08

0.08

0.09

0.090.09

0.09

0.10

0.10

Forecast Objects with Observation Outlines

Observation Objects with Forecast Outlines

Cluster Object Information

Forecast Observation

1 1

CLUS PAIR CEN DIST ANG DIFF

FCST AREA OBS AREA

INTER AREA

UNION AREA

SYMM DIFF

FCST INT 50 OBS INT 50

FCST INT 90 OBS INT 90 TOT INTR 1 26.77 3.30 7180 3882 3470 7592 4122 0.10 0.10 0.20 0.10 0.9698

Forecast: Threshold Merging

0.000.00

0.010.01

0.02

0.02

0.030.03

0.04

0.04

0.050.05

0.060.06

0.07

0.07

0.080.08

0.09

0.09

0.100.10

0.110.11

0.12

0.12

0.130.13

0.14

0.14

0.150.15

0.160.16

0.17

0.17

0.180.18

0.19

0.19

0.20

Observation: Threshold Merging

0.000.00

0.000.01

0.01

0.01

0.010.02

0.02

0.02

0.020.03

0.030.03

0.03

0.04

0.040.04

0.04

0.05

0.050.05

0.050.06

0.06

0.06

0.060.07

0.07

0.07

0.070.08

0.080.08

0.08

0.09

0.090.09

0.09

0.10

0.10